<svelte:head>
    <title>Sapper project template</title>
</svelte:head>

<p>
    <strong>
        Try editing this file (src/routes/index.svelte) to test live reloading.
    </strong>
</p>

<style>
    p {
        text-align: center;
        margin: 0 auto;
    }

    p {
        margin: 1em auto;
    }
</style>
